\hypertarget{CICE_8F90}{
\section{CICE.F90 File Reference}
\label{CICE_8F90}\index{CICE.F90@{CICE.F90}}
}
\subsection*{Functions/Subroutines}
\begin{DoxyCompactItemize}
\item 
subroutine \hyperlink{CICE_8F90_a39fddf1bf32861ff4c93670cf55cfffe}{debug\_\-ice} (plabeld)
\end{DoxyCompactItemize}


\subsection{Function Documentation}
\hypertarget{CICE_8F90_a39fddf1bf32861ff4c93670cf55cfffe}{
\index{CICE.F90@{CICE.F90}!debug\_\-ice@{debug\_\-ice}}
\index{debug\_\-ice@{debug\_\-ice}!CICE.F90@{CICE.F90}}
\subsubsection[{debug\_\-ice}]{\setlength{\rightskip}{0pt plus 5cm}subroutine debug\_\-ice (character (char\_\-len),intent(in) {\em plabeld})}}
\label{CICE_8F90_a39fddf1bf32861ff4c93670cf55cfffe}


Definition at line 58 of file CICE.F90.