\hypertarget{interfaceice__restart_1_1dumpfile}{
\section{ice\_\-restart::dumpfile Interface Reference}
\label{interfaceice__restart_1_1dumpfile}\index{ice\_\-restart::dumpfile@{ice\_\-restart::dumpfile}}
}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
subroutine \hyperlink{interfaceice__restart_1_1dumpfile_a147e781f7e477624c797b10df28d10e7}{dumpfile\_\-bin} ()
\item 
subroutine \hyperlink{interfaceice__restart_1_1dumpfile_ace62f4203c593de306ee27d9c4a54cb5}{dumpfile\_\-pio} (filename\_\-spec)
\end{DoxyCompactItemize}


\subsection{Detailed Description}


Definition at line 43 of file ice\_\-restart.F90.

\subsection{Member Function/Subroutine Documentation}
\hypertarget{interfaceice__restart_1_1dumpfile_a147e781f7e477624c797b10df28d10e7}{
\index{ice\_\-restart::dumpfile@{ice\_\-restart::dumpfile}!dumpfile\_\-bin@{dumpfile\_\-bin}}
\index{dumpfile\_\-bin@{dumpfile\_\-bin}!ice_restart::dumpfile@{ice\_\-restart::dumpfile}}
\subsubsection[{dumpfile\_\-bin}]{\setlength{\rightskip}{0pt plus 5cm}subroutine ice\_\-restart::dumpfile::dumpfile\_\-bin ()}}
\label{interfaceice__restart_1_1dumpfile_a147e781f7e477624c797b10df28d10e7}


Definition at line 114 of file ice\_\-restart.F90.\hypertarget{interfaceice__restart_1_1dumpfile_ace62f4203c593de306ee27d9c4a54cb5}{
\index{ice\_\-restart::dumpfile@{ice\_\-restart::dumpfile}!dumpfile\_\-pio@{dumpfile\_\-pio}}
\index{dumpfile\_\-pio@{dumpfile\_\-pio}!ice_restart::dumpfile@{ice\_\-restart::dumpfile}}
\subsubsection[{dumpfile\_\-pio}]{\setlength{\rightskip}{0pt plus 5cm}subroutine ice\_\-restart::dumpfile::dumpfile\_\-pio (character(len=char\_\-len\_\-long),intent(in) {\em filename\_\-spec})}}
\label{interfaceice__restart_1_1dumpfile_ace62f4203c593de306ee27d9c4a54cb5}


Definition at line 258 of file ice\_\-restart.F90.

The documentation for this interface was generated from the following file:\begin{DoxyCompactItemize}
\item 
\hyperlink{ice__restart_8F90}{ice\_\-restart.F90}\end{DoxyCompactItemize}
